USER.PZ		1.0

CLIB48E.PK	1.0

CLIB48S0.PK	1.0
CLIB48S1.PK	1.0

CLIB48H0.PK	1.0
CLIB48H1.PK	1.0

CLIB48K0.PK	1.0
CLIB48K1.PK	1.0

CLIB48F0.PK	1.0
CLIB48F1.PK	1.0
